Table 127: Muons in Cadmium telluride (CdTe)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.41665 6.200 539.3 0.24840 2.6665 0.0438 3.2836 5.9096 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.453 4.453 1.273 × 10^0 14.0 MeV 5.616 × 10^1 3.518 3.518 2.294 × 10^0 20.0 MeV 6.802 × 10^1 2.781 2.781 4.233 × 10^0 30.0 MeV 8.509 × 10^1 2.184 2.184 8.345 × 10^0 40.0 MeV 1.003 × 10^2 1.880 1.880 1.331 × 10^1 80.0 MeV 1.527 × 10^2 1.438 1.438 3.838 × 10^1 100. MeV 1.764 × 10^2 1.359 1.359 5.272 × 10^1 140. MeV 2.218 × 10^2 1.283 1.283 8.314 × 10^1 200. MeV 2.868 × 10^2 1.247 1.247 1.307 × 10^2 242. MeV 3.316 × 10^2 1.243 1.243 Minimum ionization 300. MeV 3.917 × 10^2 1.247 0.000 0.000 1.248 2.111 × 10^2 400. MeV 4.945 × 10^2 1.266 0.000 0.000 1.267 2.907 × 10^2 800. MeV 8.995 × 10^2 1.351 0.001 0.000 1.352 5.959 × 10^2 1.00 GeV 1.101 × 10^3 1.385 0.001 0.000 1.387 7.418 × 10^2 1.40 GeV 1.502 × 10^3 1.439 0.002 0.000 0.001 1.442 1.024 × 10^3 2.00 GeV 2.103 × 10^3 1.498 0.003 0.001 0.001 1.503 1.432 × 10^3 3.00 GeV 3.104 × 10^3 1.564 0.005 0.003 0.001 1.573 2.081 × 10^3 4.00 GeV 4.104 × 10^3 1.609 0.007 0.005 0.002 1.623 2.706 × 10^3 8.00 GeV 8.105 × 10^3 1.712 0.017 0.016 0.003 1.749 5.071 × 10^3 10.0 GeV 1.011 × 10^4 1.743 0.022 0.023 0.004 1.793 6.199 × 10^3 14.0 GeV 1.411 × 10^4 1.787 0.034 0.037 0.005 1.865 8.385 × 10^3 20.0 GeV 2.011 × 10^4 1.831 0.053 0.061 0.008 1.954 1.153 × 10^4 30.0 GeV 3.011 × 10^4 1.878 0.087 0.106 0.011 2.083 1.648 × 10^4 40.0 GeV 4.011 × 10^4 1.908 0.123 0.156 0.015 2.202 2.115 × 10^4 80.0 GeV 8.011 × 10^4 1.976 0.277 0.373 0.029 2.656 3.765 × 10^4 100. GeV 1.001 × 10^5 1.996 0.359 0.490 0.036 2.883 4.488 × 10^4 140. GeV 1.401 × 10^5 2.026 0.527 0.732 0.050 3.337 5.776 × 10^4 200. GeV 2.001 × 10^5 2.057 0.790 1.114 0.072 4.034 7.410 × 10^4 208. GeV 2.077 × 10^5 2.060 0.824 1.162 0.074 4.121 Muon critical energy 300. GeV 3.001 × 10^5 2.091 1.240 1.753 0.107 5.193 9.591 × 10^4 400. GeV 4.001 × 10^5 2.116 1.704 2.416 0.143 6.380 1.133 × 10^5 800. GeV 8.001 × 10^5 2.176 3.623 5.132 0.289 11.220 1.599 × 10^5 1.00 TeV 1.000 × 10^6 2.195 4.608 6.521 0.363 13.689 1.761 × 10^5 1.40 TeV 1.400 × 10^6 2.224 6.584 9.293 0.515 18.618 2.010 × 10^5 2.00 TeV 2.000 × 10^6 2.256 9.607 13.524 0.744 26.133 2.281 × 10^5 3.00 TeV 3.000 × 10^6 2.293 14.654 20.554 1.138 38.641 2.594 × 10^5 4.00 TeV 4.000 × 10^6 2.319 19.770 27.659 1.538 51.287 2.818 × 10^5 8.00 TeV 8.000 × 10^6 2.384 40.395 56.222 3.196 102.197 3.360 × 10^5 10.0 TeV 1.000 × 10^7 2.405 50.789 70.579 4.048 127.822 3.534 × 10^5 14.0 TeV 1.400 × 10^7 2.437 71.521 99.227 5.795 178.982 3.798 × 10^5 20.0 TeV 2.000 × 10^7 2.472 102.805 142.384 8.472 256.134 4.076 × 10^5 30.0 TeV 3.000 × 10^7 2.513 154.884 214.189 13.099 384.685 4.393 × 10^5 40.0 TeV 4.000 × 10^7 2.542 207.153 286.164 17.834 513.695 4.617 × 10^5 80.0 TeV 8.000 × 10^7 2.614 416.548 574.271 37.609 1031.043 5.156 × 10^5 100. TeV 1.000 × 10^8 2.637 521.426 718.459 47.822 1290.345 5.329 × 10^5