Table 123: Muons in Brain (ICRP)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55423 1.030 73.3 0.08255 3.5585 0.2206 2.8021 3.4279 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.976 7.976 6.928 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.221 6.221 1.267 × 10^0 20.0 MeV 6.802 × 10^1 4.858 4.858 2.371 × 10^0 30.0 MeV 8.509 × 10^1 3.768 3.768 4.741 × 10^0 40.0 MeV 1.003 × 10^2 3.218 3.218 7.631 × 10^0 80.0 MeV 1.527 × 10^2 2.415 2.415 2.244 × 10^1 100. MeV 1.764 × 10^2 2.271 2.271 3.100 × 10^1 140. MeV 2.218 × 10^2 2.115 2.115 4.934 × 10^1 200. MeV 2.868 × 10^2 2.025 2.025 7.844 × 10^1 300. MeV 3.917 × 10^2 1.991 0.000 1.991 1.284 × 10^2 318. MeV 4.105 × 10^2 1.990 0.000 1.990 Minimum ionization 400. MeV 4.945 × 10^2 1.997 0.000 1.997 1.786 × 10^2 800. MeV 8.995 × 10^2 2.071 0.000 0.000 2.072 3.753 × 10^2 1.00 GeV 1.101 × 10^3 2.106 0.000 0.000 2.106 4.710 × 10^2 1.40 GeV 1.502 × 10^3 2.161 0.000 0.001 2.163 6.583 × 10^2 2.00 GeV 2.103 × 10^3 2.223 0.001 0.000 0.001 2.225 9.316 × 10^2 3.00 GeV 3.104 × 10^3 2.293 0.001 0.001 0.001 2.296 1.374 × 10^3 4.00 GeV 4.104 × 10^3 2.341 0.001 0.001 0.002 2.346 1.804 × 10^3 8.00 GeV 8.105 × 10^3 2.453 0.004 0.003 0.004 2.464 3.463 × 10^3 10.0 GeV 1.011 × 10^4 2.487 0.005 0.005 0.005 2.501 4.268 × 10^3 14.0 GeV 1.411 × 10^4 2.536 0.007 0.008 0.007 2.557 5.849 × 10^3 20.0 GeV 2.011 × 10^4 2.585 0.011 0.013 0.009 2.619 8.166 × 10^3 30.0 GeV 3.011 × 10^4 2.639 0.018 0.022 0.013 2.693 1.193 × 10^4 40.0 GeV 4.011 × 10^4 2.675 0.026 0.033 0.018 2.752 1.560 × 10^4 80.0 GeV 8.011 × 10^4 2.759 0.059 0.080 0.034 2.932 2.966 × 10^4 100. GeV 1.001 × 10^5 2.785 0.077 0.105 0.042 3.010 3.639 × 10^4 140. GeV 1.401 × 10^5 2.824 0.113 0.158 0.059 3.154 4.937 × 10^4 200. GeV 2.001 × 10^5 2.864 0.171 0.242 0.084 3.361 6.779 × 10^4 300. GeV 3.001 × 10^5 2.910 0.269 0.384 0.125 3.689 9.617 × 10^4 400. GeV 4.001 × 10^5 2.943 0.372 0.532 0.167 4.014 1.221 × 10^5 800. GeV 8.001 × 10^5 3.022 0.799 1.149 0.337 5.308 2.085 × 10^5 1.00 TeV 1.000 × 10^6 3.048 1.019 1.468 0.424 5.960 2.441 × 10^5 1.05 TeV 1.046 × 10^6 3.053 1.069 1.540 0.444 6.107 Muon critical energy 1.40 TeV 1.400 × 10^6 3.088 1.463 2.102 0.601 7.255 3.048 × 10^5 2.00 TeV 2.000 × 10^6 3.130 2.146 3.075 0.871 9.221 3.780 × 10^5 3.00 TeV 3.000 × 10^6 3.178 3.290 4.693 1.334 12.496 4.708 × 10^5 4.00 TeV 4.000 × 10^6 3.213 4.454 6.335 1.806 15.808 5.418 × 10^5 8.00 TeV 8.000 × 10^6 3.299 9.169 12.946 3.769 29.183 7.253 × 10^5 10.0 TeV 1.000 × 10^7 3.327 11.553 16.275 4.780 35.937 7.869 × 10^5 14.0 TeV 1.400 × 10^7 3.371 16.312 22.910 6.864 49.457 8.814 × 10^5 20.0 TeV 2.000 × 10^7 3.417 23.512 32.916 10.067 69.912 9.830 × 10^5 30.0 TeV 3.000 × 10^7 3.471 35.500 49.566 15.625 104.162 1.099 × 10^6 40.0 TeV 4.000 × 10^7 3.510 47.553 66.269 21.330 138.662 1.182 × 10^6 80.0 TeV 8.000 × 10^7 3.605 95.899 133.136 45.276 277.917 1.382 × 10^6 100. TeV 1.000 × 10^8 3.637 120.142 166.609 57.689 348.078 1.446 × 10^6