Table 118: Muons in Blood (ICRP)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.54995 1.060 75.2 0.08492 3.5406 0.2239 2.8017 3.4581 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.888 7.888 7.006 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.153 6.153 1.281 × 10^0 20.0 MeV 6.802 × 10^1 4.806 4.806 2.397 × 10^0 30.0 MeV 8.509 × 10^1 3.728 3.728 4.793 × 10^0 40.0 MeV 1.003 × 10^2 3.184 3.184 7.714 × 10^0 80.0 MeV 1.527 × 10^2 2.390 2.390 2.268 × 10^1 100. MeV 1.764 × 10^2 2.248 2.248 3.133 × 10^1 140. MeV 2.218 × 10^2 2.094 2.094 4.985 × 10^1 200. MeV 2.868 × 10^2 2.005 2.006 7.924 × 10^1 300. MeV 3.917 × 10^2 1.972 0.000 1.972 1.297 × 10^2 318. MeV 4.105 × 10^2 1.971 0.000 1.971 Minimum ionization 400. MeV 4.945 × 10^2 1.978 0.000 1.978 1.804 × 10^2 800. MeV 8.995 × 10^2 2.053 0.000 0.000 2.053 3.789 × 10^2 1.00 GeV 1.101 × 10^3 2.087 0.000 0.000 2.087 4.755 × 10^2 1.40 GeV 1.502 × 10^3 2.142 0.000 0.001 2.143 6.645 × 10^2 2.00 GeV 2.103 × 10^3 2.203 0.001 0.000 0.001 2.205 9.402 × 10^2 3.00 GeV 3.104 × 10^3 2.273 0.001 0.001 0.001 2.276 1.386 × 10^3 4.00 GeV 4.104 × 10^3 2.321 0.001 0.001 0.002 2.326 1.820 × 10^3 8.00 GeV 8.105 × 10^3 2.432 0.004 0.003 0.004 2.443 3.493 × 10^3 10.0 GeV 1.011 × 10^4 2.466 0.005 0.005 0.005 2.480 4.306 × 10^3 14.0 GeV 1.411 × 10^4 2.514 0.007 0.008 0.007 2.536 5.900 × 10^3 20.0 GeV 2.011 × 10^4 2.564 0.011 0.013 0.009 2.597 8.236 × 10^3 30.0 GeV 3.011 × 10^4 2.617 0.018 0.023 0.013 2.671 1.203 × 10^4 40.0 GeV 4.011 × 10^4 2.653 0.026 0.033 0.018 2.730 1.573 × 10^4 80.0 GeV 8.011 × 10^4 2.736 0.060 0.080 0.034 2.910 2.990 × 10^4 100. GeV 1.001 × 10^5 2.762 0.077 0.106 0.042 2.987 3.668 × 10^4 140. GeV 1.401 × 10^5 2.800 0.114 0.159 0.059 3.132 4.975 × 10^4 200. GeV 2.001 × 10^5 2.841 0.172 0.243 0.084 3.339 6.830 × 10^4 300. GeV 3.001 × 10^5 2.886 0.271 0.386 0.125 3.669 9.685 × 10^4 400. GeV 4.001 × 10^5 2.919 0.374 0.535 0.167 3.995 1.230 × 10^5 800. GeV 8.001 × 10^5 2.997 0.803 1.156 0.337 5.294 2.096 × 10^5 1.00 TeV 1.000 × 10^6 3.023 1.025 1.477 0.424 5.949 2.453 × 10^5 1.03 TeV 1.032 × 10^6 3.027 1.061 1.528 0.438 6.054 Muon critical energy 1.40 TeV 1.400 × 10^6 3.062 1.472 2.115 0.601 7.250 3.061 × 10^5 2.00 TeV 2.000 × 10^6 3.104 2.158 3.093 0.870 9.225 3.793 × 10^5 3.00 TeV 3.000 × 10^6 3.152 3.309 4.721 1.333 12.515 4.720 × 10^5 4.00 TeV 4.000 × 10^6 3.187 4.479 6.372 1.803 15.841 5.429 × 10^5 8.00 TeV 8.000 × 10^6 3.272 9.219 13.021 3.764 29.276 7.258 × 10^5 10.0 TeV 1.000 × 10^7 3.300 11.616 16.369 4.774 36.060 7.873 × 10^5 14.0 TeV 1.400 × 10^7 3.343 16.401 23.042 6.856 49.641 8.815 × 10^5 20.0 TeV 2.000 × 10^7 3.389 23.638 33.105 10.053 70.186 9.826 × 10^5 30.0 TeV 3.000 × 10^7 3.442 35.689 49.850 15.604 104.585 1.099 × 10^6 40.0 TeV 4.000 × 10^7 3.481 47.805 66.648 21.301 139.234 1.181 × 10^6 80.0 TeV 8.000 × 10^7 3.575 96.402 133.898 45.210 279.085 1.380 × 10^6 100. TeV 1.000 × 10^8 3.607 120.770 167.562 57.604 349.543 1.444 × 10^6