Table 116: Muons in Beryllium oxide (BeO)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.47979 3.010 93.2 0.10755 3.4927 0.0241 2.5846 2.9801 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.691 6.691 8.277 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.225 5.225 1.511 × 10^0 20.0 MeV 6.802 × 10^1 4.085 4.085 2.825 × 10^0 30.0 MeV 8.509 × 10^1 3.172 3.172 5.642 × 10^0 40.0 MeV 1.003 × 10^2 2.711 2.711 9.074 × 10^0 80.0 MeV 1.527 × 10^2 2.025 2.025 2.668 × 10^1 100. MeV 1.764 × 10^2 1.897 1.898 3.691 × 10^1 140. MeV 2.218 × 10^2 1.768 1.768 5.886 × 10^1 200. MeV 2.868 × 10^2 1.693 1.694 9.367 × 10^1 300. MeV 3.917 × 10^2 1.665 0.000 1.666 1.534 × 10^2 317. MeV 4.096 × 10^2 1.665 0.000 1.665 Minimum ionization 400. MeV 4.945 × 10^2 1.671 0.000 1.671 2.134 × 10^2 800. MeV 8.995 × 10^2 1.735 0.000 0.000 1.735 4.483 × 10^2 1.00 GeV 1.101 × 10^3 1.764 0.000 0.000 1.764 5.626 × 10^2 1.40 GeV 1.502 × 10^3 1.811 0.000 0.001 1.812 7.862 × 10^2 2.00 GeV 2.103 × 10^3 1.863 0.001 0.000 0.001 1.864 1.112 × 10^3 3.00 GeV 3.104 × 10^3 1.922 0.001 0.001 0.001 1.925 1.640 × 10^3 4.00 GeV 4.104 × 10^3 1.963 0.001 0.001 0.002 1.967 2.153 × 10^3 8.00 GeV 8.105 × 10^3 2.057 0.003 0.003 0.004 2.067 4.131 × 10^3 10.0 GeV 1.011 × 10^4 2.086 0.004 0.004 0.005 2.099 5.091 × 10^3 14.0 GeV 1.411 × 10^4 2.128 0.006 0.007 0.007 2.148 6.973 × 10^3 20.0 GeV 2.011 × 10^4 2.170 0.010 0.011 0.009 2.201 9.731 × 10^3 30.0 GeV 3.011 × 10^4 2.216 0.016 0.020 0.013 2.266 1.421 × 10^4 40.0 GeV 4.011 × 10^4 2.248 0.023 0.029 0.018 2.318 1.857 × 10^4 80.0 GeV 8.011 × 10^4 2.320 0.053 0.071 0.034 2.478 3.523 × 10^4 100. GeV 1.001 × 10^5 2.343 0.068 0.094 0.042 2.547 4.319 × 10^4 140. GeV 1.401 × 10^5 2.376 0.101 0.141 0.059 2.677 5.850 × 10^4 200. GeV 2.001 × 10^5 2.411 0.152 0.215 0.083 2.862 8.017 × 10^4 300. GeV 3.001 × 10^5 2.451 0.240 0.342 0.125 3.158 1.134 × 10^5 400. GeV 4.001 × 10^5 2.479 0.331 0.474 0.166 3.451 1.437 × 10^5 800. GeV 8.001 × 10^5 2.548 0.710 1.024 0.336 4.619 2.435 × 10^5 976. GeV 9.758 × 10^5 2.568 0.882 1.274 0.412 5.136 Muon critical energy 1.00 TeV 1.000 × 10^6 2.570 0.906 1.309 0.422 5.208 2.843 × 10^5 1.40 TeV 1.400 × 10^6 2.604 1.301 1.875 0.599 6.379 3.536 × 10^5 2.00 TeV 2.000 × 10^6 2.641 1.907 2.742 0.867 8.158 4.366 × 10^5 3.00 TeV 3.000 × 10^6 2.683 2.924 4.186 1.329 11.122 5.412 × 10^5 4.00 TeV 4.000 × 10^6 2.713 3.957 5.651 1.799 14.120 6.208 × 10^5 8.00 TeV 8.000 × 10^6 2.788 8.141 11.549 3.754 26.233 8.254 × 10^5 10.0 TeV 1.000 × 10^7 2.812 10.257 14.520 4.761 32.351 8.940 × 10^5 14.0 TeV 1.400 × 10^7 2.849 14.478 20.440 6.836 44.604 9.988 × 10^5 20.0 TeV 2.000 × 10^7 2.890 20.861 29.370 10.024 63.145 1.111 × 10^6 30.0 TeV 3.000 × 10^7 2.936 31.490 44.226 15.557 94.210 1.240 × 10^6 40.0 TeV 4.000 × 10^7 2.970 42.174 59.131 21.235 125.511 1.332 × 10^6 80.0 TeV 8.000 × 10^7 3.053 85.014 118.803 45.058 251.928 1.552 × 10^6 100. TeV 1.000 × 10^8 3.080 106.490 148.674 57.406 315.650 1.623 × 10^6