Table 249: b(E) × 10^6 [cm^2g^{−1}] for Silver iodide AgI ⟨Z/A⟩ = 0.42594

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3587 0.5396 0.3832 2.2815 5. 1.8718 1.5583 0.4095 3.8395 10. 2.2891 2.3482 0.3966 5.0339 20. 2.7173 3.1136 0.3810 6.2119 50. 3.2795 4.2559 0.3700 7.9054 100. 3.6812 5.0193 0.3620 9.0625 200. 4.0503 5.7031 0.3583 10.1117 500. 4.4685 6.3369 0.3584 11.1638 1000. 4.7231 6.6762 0.3640 11.7633 2000. 4.9232 6.9225 0.3729 12.2186 5000. 5.1110 7.1294 0.3892 12.6296 10000. 5.2050 7.2257 0.4055 12.8361 20000. 5.2678 7.2884 0.4244 12.9806 50000. 5.3200 7.3356 0.4540 13.1095 100000. 5.3436 7.3552 0.4791 13.1779