Table 204: b(E) × 10^6 [cm^2g^{−1}] for Muscle-equivalent liquid without sucrose ⟨Z/A⟩ = 0.55014

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2825 0.1241 0.4702 0.8767 5. 0.3832 0.3065 0.4977 1.1874 10. 0.4665 0.4631 0.4828 1.4125 20. 0.5544 0.6335 0.4605 1.6484 50. 0.6739 0.8734 0.4361 1.9835 100. 0.7628 1.0430 0.4242 2.2299 200. 0.8477 1.1992 0.4181 2.4649 500. 0.9478 1.3595 0.4171 2.7245 1000. 1.0120 1.4578 0.4238 2.8936 2000. 1.0654 1.5268 0.4352 3.0273 5000. 1.1187 1.5877 0.4563 3.1628 10000. 1.1471 1.6165 0.4778 3.2415 20000. 1.1672 1.6346 0.5031 3.3049 50000. 1.1846 1.6490 0.5426 3.3761 100000. 1.1928 1.6548 0.5766 3.4243