Table 154: b(E) × 10^6 [cm^2g^{−1}] for Ethyl cellulose (C_{12}H_{22}O5)_n

⟨Z/A⟩ = 0.54405

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2532 0.1098 0.4740 0.8371 5. 0.3435 0.2724 0.5012 1.1171 10. 0.4185 0.4137 0.4859 1.3182 20. 0.4978 0.5680 0.4633 1.5291 50. 0.6061 0.7848 0.4385 1.8296 100. 0.6876 0.9386 0.4264 2.0526 200. 0.7644 1.0806 0.4203 2.2653 500. 0.8560 1.2276 0.4193 2.5029 1000. 0.9149 1.3181 0.4261 2.6591 2000. 0.9640 1.3821 0.4375 2.7836 5000. 1.0133 1.4387 0.4590 2.9110 10000. 1.0396 1.4654 0.4806 2.9857 20000. 1.0582 1.4823 0.5062 3.0467 50000. 1.0744 1.4956 0.5462 3.1161 100000. 1.0817 1.5010 0.5806 3.1633