Table 150: b(E) × 10^6 [cm^2g^{−1}] for m,n-Dimethyl formamide (C_3H_6NOH) ⟨Z/A⟩ = 0.54724

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2517 0.1090 0.4745 0.8353 5. 0.3415 0.2705 0.5018 1.1138 10. 0.4160 0.4112 0.4864 1.3137 20. 0.4950 0.5648 0.4637 1.5235 50. 0.6028 0.7805 0.4389 1.8223 100. 0.6839 0.9336 0.4268 2.0442 200. 0.7605 1.0749 0.4206 2.2560 500. 0.8518 1.2214 0.4196 2.4928 1000. 0.9106 1.3116 0.4264 2.6486 2000. 0.9595 1.3754 0.4379 2.7728 5000. 1.0087 1.4319 0.4593 2.9000 10000. 1.0350 1.4586 0.4810 2.9747 20000. 1.0537 1.4754 0.5066 3.0357 50000. 1.0698 1.4886 0.5467 3.1051 100000. 1.0772 1.4940 0.5811 3.1524