Table 139: b(E) × 10^6 [cm^2g^{−1}] for Ceric sulfate dosimeter solution

⟨Z/A⟩ = 0.55279

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2973 0.1310 0.4687 0.8970 5. 0.4035 0.3239 0.4963 1.2237 10. 0.4911 0.4885 0.4815 1.4613 20. 0.5835 0.6672 0.4594 1.7100 50. 0.7088 0.9190 0.4351 2.0630 100. 0.8016 1.0967 0.4232 2.3216 200. 0.8906 1.2600 0.4171 2.5677 500. 0.9951 1.4274 0.4162 2.8387 1000. 1.0620 1.5293 0.4229 3.0142 2000. 1.1175 1.6009 0.4342 3.1526 5000. 1.1730 1.6640 0.4552 3.2922 10000. 1.2024 1.6937 0.4766 3.3729 20000. 1.2232 1.7125 0.5018 3.4375 50000. 1.2411 1.7274 0.5411 3.5097 100000. 1.2498 1.7334 0.5749 3.5582