Muons in gold (Au)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
79 (Au) 196.966569(5) 19.320  790.0 0.09756 3.1101 0.2021 3.6979 5.5747  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.910  3.910  1.486 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.120  3.120  2.642 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.485  2.485  4.819 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.964  1.964  9.402 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.696  1.696  1.491 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.302  1.302  4.262 × 10^{1}
100. MeV 1.764 × 10^{2} 1.232  1.232  5.845 × 10^{1}
140. MeV 2.218 × 10^{2} 1.166  1.166  9.196 × 10^{1}
200. MeV 2.868 × 10^{2} 1.136  1.137  1.442 × 10^{2}
236. MeV 3.250 × 10^{2} 1.134  0.000  1.134 Minimum ionization
300. MeV 3.917 × 10^{2} 1.139  0.000  0.000  1.140  2.323 × 10^{2}
400. MeV 4.945 × 10^{2} 1.158  0.000  0.000  1.159  3.194 × 10^{2}
800. MeV 8.995 × 10^{2} 1.240  0.001  0.000  1.241  6.523 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.272  0.001  0.000  1.274  8.113 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.323  0.002  0.001  1.326  1.119 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.378  0.004  0.001  0.001  1.384  1.561 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.440  0.007  0.003  0.001  1.452  2.266 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.483  0.010  0.006  0.002  1.501  2.943 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.580  0.025  0.022  0.003  1.630  5.490 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.609  0.033  0.031  0.004  1.677  6.699 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.651  0.050  0.050  0.005  1.757  9.028 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.693  0.077  0.083  0.007  1.862  1.234 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.737  0.127  0.146  0.011  2.022  1.749 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.767  0.179  0.215  0.014  2.176  2.226 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.833  0.405  0.520  0.028  2.787  3.846 × 10^{4}
100. GeV 1.001 × 10^{5} 1.853  0.525  0.684  0.035  3.098  4.527 × 10^{4}
140. GeV 1.401 × 10^{5} 1.882  0.771  1.022  0.048  3.724  5.703 × 10^{4}
143. GeV 1.429 × 10^{5} 1.884  0.788  1.047  0.049  3.769 Muon critical energy
200. GeV 2.001 × 10^{5} 1.912  1.155  1.558  0.069  4.695  7.136 × 10^{4}
300. GeV 3.001 × 10^{5} 1.946  1.810  2.453  0.103  6.314  8.967 × 10^{4}
400. GeV 4.001 × 10^{5} 1.969  2.488  3.381  0.137  7.976  1.037 × 10^{5}
800. GeV 8.001 × 10^{5} 2.027  5.282  7.182  0.277  14.770  1.400 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.045  6.716  9.127  0.348  18.238  1.522 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.074  9.590  13.004  0.493  25.162  1.708 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.104  13.983  18.920  0.713  35.722  1.907 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.139  21.314  28.750  1.089  53.294  2.135 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.165  28.739  38.683  1.472  71.060  2.297 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.227  58.660  78.606  3.055 142.551  2.687 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.247  73.732  98.672  3.868 178.521  2.812 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.279 103.793 138.710  5.535 250.319  3.000 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.312 149.136 199.020  8.090 358.560  3.199 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.351 224.621 299.358  12.501 538.834  3.425 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.379 300.363 399.928  17.015 719.687  3.585 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.448 603.732 802.482  35.848 1444.513  3.970 × 10^{5}
100. TeV 1.000 × 10^{8} 2.471 755.650 1003.940  45.570 1807.633  4.093 × 10^{5}