Muons in dysprosium (Dy)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
66 (Dy) 162.500(1)  8.551  628.0 0.24665 2.5849 0.0822 3.4474 5.9182  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.162  4.162  1.381 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.304  3.304  2.469 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.621  2.621  4.530 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.063  2.063  8.887 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.776  1.776  1.414 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.357  1.357  4.069 × 10^{1}
100. MeV 1.764 × 10^{2} 1.283  1.283  5.589 × 10^{1}
140. MeV 2.218 × 10^{2} 1.212  1.212  8.810 × 10^{1}
200. MeV 2.868 × 10^{2} 1.179  1.179  1.384 × 10^{2}
239. MeV 3.285 × 10^{2} 1.175  0.000  1.176 Minimum ionization
300. MeV 3.917 × 10^{2} 1.180  0.000  0.000  1.181  2.234 × 10^{2}
400. MeV 4.945 × 10^{2} 1.199  0.000  0.000  1.200  3.074 × 10^{2}
800. MeV 8.995 × 10^{2} 1.283  0.001  0.000  1.284  6.292 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.316  0.001  0.000  1.318  7.829 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.369  0.002  0.000  0.001  1.372  1.080 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.427  0.003  0.001  0.001  1.432  1.508 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.492  0.006  0.003  0.001  1.503  2.188 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.537  0.009  0.006  0.002  1.554  2.842 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.640  0.021  0.020  0.003  1.684  5.305 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.671  0.028  0.028  0.004  1.731  6.475 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.715  0.043  0.045  0.005  1.809  8.734 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.760  0.067  0.074  0.007  1.908  1.196 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.806  0.109  0.129  0.011  2.056  1.701 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.837  0.154  0.190  0.014  2.197  2.171 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.906  0.348  0.457  0.028  2.740  3.797 × 10^{4}
100. GeV 1.001 × 10^{5} 1.926  0.451  0.602  0.035  3.015  4.493 × 10^{4}
140. GeV 1.401 × 10^{5} 1.956  0.662  0.898  0.049  3.566  5.712 × 10^{4}
167. GeV 1.669 × 10^{5} 1.971  0.808  1.105  0.058  3.943 Muon critical energy
200. GeV 2.001 × 10^{5} 1.986  0.992  1.368  0.070  4.417  7.222 × 10^{4}
300. GeV 3.001 × 10^{5} 2.020  1.555  2.153  0.105  5.834  9.186 × 10^{4}
400. GeV 4.001 × 10^{5} 2.044  2.137  2.966  0.139  7.288  1.072 × 10^{5}
800. GeV 8.001 × 10^{5} 2.102  4.540  6.300  0.282  13.225  1.474 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.121  5.774  8.005  0.354  16.255  1.610 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.150  8.246  11.406  0.501  22.305  1.819 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.181  12.027  16.594  0.725  31.529  2.044 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.216  18.337  25.217  1.109  46.880  2.303 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.242  24.730  33.930  1.498  62.401  2.487 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.305  50.497  68.951  3.111 124.866  2.931 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.326  63.479  86.553  3.939 156.298  3.074 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.357  89.372 121.677  5.638 219.046  3.289 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.391 128.434 174.586  8.240 313.653  3.517 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.431 193.462 262.612  12.736 471.242  3.775 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.459 258.717 350.842  17.336 629.356  3.958 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.529 520.105 704.008  36.531 1263.175  4.398 × 10^{5}
100. TeV 1.000 × 10^{8} 2.552 651.010 880.750  46.440 1580.754  4.539 × 10^{5}