Muons in chlorine gas (Cl_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
17 (Cl) 35.453(2) 2.980 × 10^{−3} 174.0 0.19849 2.9702 1.5566 4.3005 11.1470 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.123  6.123  9.124 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.800  4.800  1.658 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.766  3.766  3.085 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.936  2.936  6.134 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.514  2.514  9.838 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.901  1.901  2.871 × 10^{1}
100. MeV 1.764 × 10^{2} 1.792  1.792  3.957 × 10^{1}
140. MeV 2.218 × 10^{2} 1.687  1.687  6.268 × 10^{1}
200. MeV 2.868 × 10^{2} 1.636  1.636  9.892 × 10^{1}
246. MeV 3.356 × 10^{2} 1.630  0.000  1.630 Minimum ionization
300. MeV 3.917 × 10^{2} 1.636  0.000  1.636  1.602 × 10^{2}
400. MeV 4.945 × 10^{2} 1.662  0.000  0.000  1.662  2.209 × 10^{2}
800. MeV 8.995 × 10^{2} 1.784  0.000  0.000  1.785  4.528 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.835  0.000  0.000  1.836  5.632 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.917  0.001  0.000  0.001  1.919  7.761 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.010  0.001  0.001  0.001  2.013  1.081 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.119  0.002  0.001  0.001  2.124  1.564 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.196  0.003  0.002  0.002  2.204  2.026 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.367  0.007  0.007  0.004  2.385  3.761 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.418  0.010  0.010  0.004  2.442  4.590 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.489  0.015  0.016  0.006  2.527  6.198 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.560  0.023  0.027  0.009  2.619  8.528 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.634  0.038  0.046  0.013  2.731  1.226 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.682  0.053  0.068  0.016  2.820  1.586 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.787  0.120  0.163  0.032  3.102  2.936 × 10^{4}
100. GeV 1.001 × 10^{5} 2.817  0.155  0.215  0.040  3.227  3.568 × 10^{4}
140. GeV 1.401 × 10^{5} 2.860  0.228  0.321  0.055  3.466  4.763 × 10^{4}
200. GeV 2.001 × 10^{5} 2.904  0.343  0.490  0.078  3.816  6.412 × 10^{4}
300. GeV 3.001 × 10^{5} 2.950  0.539  0.775  0.118  4.382  8.856 × 10^{4}
400. GeV 4.001 × 10^{5} 2.982  0.742  1.070  0.157  4.951  1.100 × 10^{5}
592. GeV 5.920 × 10^{5} 3.024  1.142  1.649  0.233  6.048 Muon critical energy
800. GeV 8.001 × 10^{5} 3.055  1.583  2.285  0.317  7.241  1.764 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.078  2.016  2.909  0.398  8.402  2.021 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.112  2.887  4.154  0.565  10.718  2.441 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.149  4.220  6.058  0.817  14.245  2.925 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.191  6.451  9.223  1.251  20.116  3.513 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.221  8.715  12.426  1.692  26.054  3.949 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.295  17.860  25.311  3.524  49.991  5.038 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.320  22.476  31.794  4.466  62.056  5.397 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.357  31.691  44.718  6.403  86.171  5.941 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.397  45.614  64.196  9.376 122.584  6.522 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.444  68.764  96.622  14.525 183.355  7.185 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.477  92.009 129.139  19.802 244.428  7.656 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.560 185.203 259.302  41.886 489.952  8.789 × 10^{5}
100. TeV 1.000 × 10^{8} 3.587 231.910 324.450  53.310 613.258  9.153 × 10^{5}