Table 276: Muons in Water (liquid) (H_2O)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55509 1.000 75.0 0.09116 3.4773 0.2400 2.8004 3.5017 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.965 7.965 6.939 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.213 6.213 1.269 × 10^0 20.0 MeV 6.802 × 10^1 4.852 4.852 2.374 × 10^0 30.0 MeV 8.509 × 10^1 3.764 3.764 4.747 × 10^0 40.0 MeV 1.003 × 10^2 3.214 3.214 7.640 × 10^0 80.0 MeV 1.527 × 10^2 2.413 2.413 2.246 × 10^1 100. MeV 1.764 × 10^2 2.270 2.270 3.103 × 10^1 140. MeV 2.218 × 10^2 2.116 2.116 4.936 × 10^1 200. MeV 2.868 × 10^2 2.026 2.026 7.844 × 10^1 300. MeV 3.917 × 10^2 1.992 0.000 1.992 1.284 × 10^2 318. MeV 4.105 × 10^2 1.992 0.000 1.992 Minimum ionization 400. MeV 4.945 × 10^2 1.998 0.000 1.999 1.785 × 10^2 800. MeV 8.995 × 10^2 2.074 0.000 0.000 2.075 3.750 × 10^2 1.00 GeV 1.101 × 10^3 2.109 0.000 0.000 2.109 4.706 × 10^2 1.40 GeV 1.502 × 10^3 2.165 0.000 0.001 2.166 6.576 × 10^2 2.00 GeV 2.103 × 10^3 2.227 0.001 0.000 0.001 2.229 9.305 × 10^2 3.00 GeV 3.104 × 10^3 2.297 0.001 0.001 0.001 2.300 1.372 × 10^3 4.00 GeV 4.104 × 10^3 2.346 0.001 0.001 0.002 2.351 1.801 × 10^3 8.00 GeV 8.105 × 10^3 2.458 0.004 0.003 0.004 2.470 3.456 × 10^3 10.0 GeV 1.011 × 10^4 2.492 0.005 0.005 0.005 2.507 4.260 × 10^3 14.0 GeV 1.411 × 10^4 2.542 0.007 0.008 0.007 2.564 5.837 × 10^3 20.0 GeV 2.011 × 10^4 2.592 0.011 0.013 0.009 2.625 8.148 × 10^3 30.0 GeV 3.011 × 10^4 2.645 0.019 0.023 0.013 2.701 1.190 × 10^4 40.0 GeV 4.011 × 10^4 2.682 0.027 0.034 0.018 2.760 1.556 × 10^4 80.0 GeV 8.011 × 10^4 2.766 0.060 0.081 0.034 2.942 2.958 × 10^4 100. GeV 1.001 × 10^5 2.792 0.078 0.107 0.042 3.020 3.629 × 10^4 140. GeV 1.401 × 10^5 2.831 0.116 0.161 0.059 3.166 4.922 × 10^4 200. GeV 2.001 × 10^5 2.871 0.174 0.246 0.084 3.375 6.757 × 10^4 300. GeV 3.001 × 10^5 2.917 0.275 0.391 0.125 3.709 9.581 × 10^4 400. GeV 4.001 × 10^5 2.950 0.379 0.542 0.167 4.038 1.216 × 10^5 800. GeV 8.001 × 10^5 3.030 0.814 1.171 0.337 5.351 2.074 × 10^5 1.00 TeV 1.000 × 10^6 3.055 1.038 1.496 0.423 6.013 2.426 × 10^5 1.03 TeV 1.032 × 10^6 3.059 1.074 1.547 0.438 6.118 Muon critical energy 1.40 TeV 1.400 × 10^6 3.095 1.491 2.142 0.601 7.328 3.028 × 10^5 2.00 TeV 2.000 × 10^6 3.137 2.186 3.132 0.870 9.325 3.752 × 10^5 3.00 TeV 3.000 × 10^6 3.186 3.352 4.781 1.332 12.650 4.670 × 10^5 4.00 TeV 4.000 × 10^6 3.221 4.537 6.452 1.803 16.013 5.371 × 10^5 8.00 TeV 8.000 × 10^6 3.307 9.338 13.185 3.763 29.593 7.181 × 10^5 10.0 TeV 1.000 × 10^7 3.335 11.766 16.575 4.773 36.450 7.789 × 10^5 14.0 TeV 1.400 × 10^7 3.378 16.613 23.331 6.854 50.176 8.720 × 10^5 20.0 TeV 2.000 × 10^7 3.425 23.944 33.521 10.051 70.941 9.721 × 10^5 30.0 TeV 3.000 × 10^7 3.479 36.151 50.475 15.600 105.705 1.087 × 10^6 40.0 TeV 4.000 × 10^7 3.517 48.424 67.484 21.296 140.722 1.169 × 10^6 80.0 TeV 8.000 × 10^7 3.613 97.657 135.575 45.199 282.045 1.365 × 10^6 100. TeV 1.000 × 10^8 3.645 122.347 169.661 57.590 353.242 1.429 × 10^6