Table 231: Muons in Polyvinyl butyral [C_8H_{13}0_2]_n

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.54537 1.120 67.2 0.11544 3.3983 0.1555 2.6186 3.1865 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.936 7.937 6.957 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.188 6.188 1.273 × 10^0 20.0 MeV 6.802 × 10^1 4.830 4.830 2.383 × 10^0 30.0 MeV 8.509 × 10^1 3.745 3.745 4.767 × 10^0 40.0 MeV 1.003 × 10^2 3.197 3.197 7.676 × 10^0 80.0 MeV 1.527 × 10^2 2.398 2.398 2.258 × 10^1 100. MeV 1.764 × 10^2 2.245 2.245 3.123 × 10^1 140. MeV 2.218 × 10^2 2.089 2.089 4.979 × 10^1 200. MeV 2.868 × 10^2 1.999 1.999 7.926 × 10^1 300. MeV 3.917 × 10^2 1.963 0.000 1.963 1.299 × 10^2 325. MeV 4.171 × 10^2 1.962 0.000 1.963 Minimum ionization 400. MeV 4.945 × 10^2 1.968 0.000 1.968 1.808 × 10^2 800. MeV 8.995 × 10^2 2.040 0.000 0.000 2.040 3.805 × 10^2 1.00 GeV 1.101 × 10^3 2.073 0.000 0.000 2.074 4.777 × 10^2 1.40 GeV 1.502 × 10^3 2.127 0.000 0.001 2.128 6.680 × 10^2 2.00 GeV 2.103 × 10^3 2.186 0.001 0.000 0.001 2.188 9.459 × 10^2 3.00 GeV 3.104 × 10^3 2.254 0.001 0.001 0.001 2.257 1.395 × 10^3 4.00 GeV 4.104 × 10^3 2.301 0.001 0.001 0.002 2.306 1.833 × 10^3 8.00 GeV 8.105 × 10^3 2.410 0.003 0.003 0.004 2.420 3.522 × 10^3 10.0 GeV 1.011 × 10^4 2.443 0.004 0.004 0.005 2.456 4.342 × 10^3 14.0 GeV 1.411 × 10^4 2.490 0.006 0.007 0.007 2.510 5.952 × 10^3 20.0 GeV 2.011 × 10^4 2.539 0.010 0.011 0.009 2.569 8.314 × 10^3 30.0 GeV 3.011 × 10^4 2.591 0.016 0.019 0.014 2.640 1.215 × 10^4 40.0 GeV 4.011 × 10^4 2.627 0.023 0.028 0.018 2.696 1.590 × 10^4 80.0 GeV 8.011 × 10^4 2.709 0.051 0.069 0.034 2.865 3.027 × 10^4 100. GeV 1.001 × 10^5 2.735 0.067 0.091 0.043 2.936 3.716 × 10^4 140. GeV 1.401 × 10^5 2.773 0.099 0.137 0.059 3.069 5.048 × 10^4 200. GeV 2.001 × 10^5 2.813 0.149 0.210 0.084 3.257 6.946 × 10^4 300. GeV 3.001 × 10^5 2.858 0.235 0.335 0.126 3.554 9.883 × 10^4 400. GeV 4.001 × 10^5 2.890 0.325 0.464 0.168 3.848 1.259 × 10^5 800. GeV 8.001 × 10^5 2.968 0.698 1.004 0.340 5.011 2.167 × 10^5 1.00 TeV 1.000 × 10^6 2.994 0.891 1.284 0.427 5.596 2.544 × 10^5 1.15 TeV 1.146 × 10^6 3.009 1.032 1.486 0.492 6.019 Muon critical energy 1.40 TeV 1.400 × 10^6 3.032 1.281 1.840 0.605 6.759 3.194 × 10^5 2.00 TeV 2.000 × 10^6 3.074 1.879 2.693 0.877 8.523 3.983 × 10^5 3.00 TeV 3.000 × 10^6 3.122 2.882 4.114 1.344 11.462 4.991 × 10^5 4.00 TeV 4.000 × 10^6 3.156 3.904 5.555 1.818 14.434 5.767 × 10^5 8.00 TeV 8.000 × 10^6 3.241 8.042 11.361 3.796 26.441 7.785 × 10^5 10.0 TeV 1.000 × 10^7 3.269 10.136 14.286 4.816 32.507 8.466 × 10^5 14.0 TeV 1.400 × 10^7 3.311 14.315 20.113 6.916 44.656 9.511 × 10^5 20.0 TeV 2.000 × 10^7 3.357 20.639 28.903 10.144 63.044 1.064 × 10^6 30.0 TeV 3.000 × 10^7 3.410 31.170 43.528 15.749 93.857 1.193 × 10^6 40.0 TeV 4.000 × 10^7 3.448 41.760 58.201 21.503 124.911 1.285 × 10^6 80.0 TeV 8.000 × 10^7 3.542 84.215 116.944 45.660 250.361 1.507 × 10^6 100. TeV 1.000 × 10^8 3.573 105.498 146.351 58.187 313.609 1.578 × 10^6