Table 135: Muons in Carbon tetrachloride CCl_4

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.49107 1.594 166.3 0.19018 3.0116 0.1773 2.9165 4.7712 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.320 6.320 8.817 × 10^{−1} 14.0 MeV 5.616 × 10^1 4.951 4.951 1.604 × 10^0 20.0 MeV 6.802 × 10^1 3.883 3.883 2.988 × 10^0 30.0 MeV 8.509 × 10^1 3.025 3.025 5.946 × 10^0 40.0 MeV 1.003 × 10^2 2.590 2.590 9.542 × 10^0 80.0 MeV 1.527 × 10^2 1.957 1.957 2.786 × 10^1 100. MeV 1.764 × 10^2 1.843 1.843 3.842 × 10^1 140. MeV 2.218 × 10^2 1.729 1.730 6.092 × 10^1 200. MeV 2.868 × 10^2 1.669 1.669 9.636 × 10^1 277. MeV 3.673 × 10^2 1.654 0.000 1.655 Minimum ionization 300. MeV 3.917 × 10^2 1.655 0.000 1.656 1.567 × 10^2 400. MeV 4.945 × 10^2 1.671 0.000 0.000 1.671 2.168 × 10^2 800. MeV 8.995 × 10^2 1.757 0.000 0.000 1.757 4.501 × 10^2 1.00 GeV 1.101 × 10^3 1.793 0.000 0.000 1.794 5.627 × 10^2 1.40 GeV 1.502 × 10^3 1.850 0.001 0.000 0.001 1.852 7.820 × 10^2 2.00 GeV 2.103 × 10^3 1.913 0.001 0.001 0.001 1.915 1.100 × 10^3 3.00 GeV 3.104 × 10^3 1.983 0.002 0.001 0.001 1.988 1.612 × 10^3 4.00 GeV 4.104 × 10^3 2.031 0.003 0.002 0.002 2.038 2.109 × 10^3 8.00 GeV 8.105 × 10^3 2.140 0.007 0.007 0.004 2.158 4.010 × 10^3 10.0 GeV 1.011 × 10^4 2.172 0.009 0.010 0.004 2.196 4.928 × 10^3 14.0 GeV 1.411 × 10^4 2.219 0.014 0.016 0.006 2.255 6.724 × 10^3 20.0 GeV 2.011 × 10^4 2.265 0.022 0.025 0.009 2.322 9.345 × 10^3 30.0 GeV 3.011 × 10^4 2.315 0.036 0.044 0.013 2.408 1.357 × 10^4 40.0 GeV 4.011 × 10^4 2.348 0.051 0.065 0.017 2.480 1.766 × 10^4 80.0 GeV 8.011 × 10^4 2.422 0.115 0.156 0.032 2.725 3.302 × 10^4 100. GeV 1.001 × 10^5 2.445 0.148 0.205 0.040 2.839 4.021 × 10^4 140. GeV 1.401 × 10^5 2.480 0.218 0.307 0.056 3.061 5.378 × 10^4 200. GeV 2.001 × 10^5 2.516 0.327 0.468 0.079 3.391 7.240 × 10^4 300. GeV 3.001 × 10^5 2.557 0.515 0.740 0.118 3.930 9.977 × 10^4 400. GeV 4.001 × 10^5 2.585 0.709 1.022 0.158 4.474 1.236 × 10^5 538. GeV 5.381 × 10^5 2.615 0.983 1.420 0.212 5.231 Muon critical energy 800. GeV 8.001 × 10^5 2.656 1.513 2.183 0.319 6.671 1.964 × 10^5 1.00 TeV 1.000 × 10^6 2.679 1.927 2.780 0.400 7.786 2.241 × 10^5 1.40 TeV 1.400 × 10^6 2.713 2.759 3.970 0.568 10.010 2.693 × 10^5 2.00 TeV 2.000 × 10^6 2.751 4.034 5.790 0.821 13.397 3.209 × 10^5 3.00 TeV 3.000 × 10^6 2.794 6.166 8.816 1.257 19.034 3.833 × 10^5 4.00 TeV 4.000 × 10^6 2.825 8.331 11.879 1.701 24.736 4.292 × 10^5 8.00 TeV 8.000 × 10^6 2.901 17.076 24.201 3.543 47.722 5.436 × 10^5 10.0 TeV 1.000 × 10^7 2.926 21.491 30.400 4.491 59.308 5.811 × 10^5 14.0 TeV 1.400 × 10^7 2.964 30.303 42.759 6.440 82.467 6.381 × 10^5 20.0 TeV 2.000 × 10^7 3.005 43.618 61.386 9.431 117.440 6.987 × 10^5 30.0 TeV 3.000 × 10^7 3.053 65.758 92.394 14.612 175.818 7.679 × 10^5 40.0 TeV 4.000 × 10^7 3.087 87.991 123.491 19.923 234.492 8.170 × 10^5 80.0 TeV 8.000 × 10^7 3.172 177.123 247.966 42.154 470.416 9.350 × 10^5 100. TeV 1.000 × 10^8 3.200 221.794 310.268 53.656 588.918 9.730 × 10^5