Table 100: Muons in Acetone (CH_3CHCH_3)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55097 0.790 64.2 0.11100 3.4047 0.2197 2.6928 3.4341 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.065 8.065 6.843 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.286 6.286 1.252 × 10^0 20.0 MeV 6.802 × 10^1 4.906 4.906 2.345 × 10^0 30.0 MeV 8.509 × 10^1 3.803 3.803 4.693 × 10^0 40.0 MeV 1.003 × 10^2 3.246 3.246 7.557 × 10^0 80.0 MeV 1.527 × 10^2 2.434 2.434 2.224 × 10^1 100. MeV 1.764 × 10^2 2.288 2.288 3.074 × 10^1 140. MeV 2.218 × 10^2 2.130 2.130 4.894 × 10^1 200. MeV 2.868 × 10^2 2.039 2.039 7.784 × 10^1 300. MeV 3.917 × 10^2 2.003 0.000 2.004 1.275 × 10^2 318. MeV 4.105 × 10^2 2.003 0.000 2.003 Minimum ionization 400. MeV 4.945 × 10^2 2.009 0.000 2.009 1.774 × 10^2 800. MeV 8.995 × 10^2 2.083 0.000 0.000 2.083 3.729 × 10^2 1.00 GeV 1.101 × 10^3 2.117 0.000 0.000 2.118 4.681 × 10^2 1.40 GeV 1.502 × 10^3 2.172 0.000 0.001 2.173 6.545 × 10^2 2.00 GeV 2.103 × 10^3 2.233 0.001 0.000 0.001 2.235 9.265 × 10^2 3.00 GeV 3.104 × 10^3 2.303 0.001 0.001 0.001 2.306 1.366 × 10^3 4.00 GeV 4.104 × 10^3 2.351 0.001 0.001 0.002 2.356 1.795 × 10^3 8.00 GeV 8.105 × 10^3 2.462 0.003 0.003 0.004 2.472 3.448 × 10^3 10.0 GeV 1.011 × 10^4 2.495 0.004 0.004 0.005 2.509 4.251 × 10^3 14.0 GeV 1.411 × 10^4 2.544 0.006 0.007 0.007 2.564 5.827 × 10^3 20.0 GeV 2.011 × 10^4 2.593 0.010 0.011 0.009 2.624 8.139 × 10^3 30.0 GeV 3.011 × 10^4 2.646 0.016 0.020 0.014 2.696 1.190 × 10^4 40.0 GeV 4.011 × 10^4 2.683 0.023 0.029 0.018 2.752 1.557 × 10^4 80.0 GeV 8.011 × 10^4 2.766 0.052 0.070 0.035 2.922 2.965 × 10^4 100. GeV 1.001 × 10^5 2.792 0.067 0.092 0.043 2.994 3.641 × 10^4 140. GeV 1.401 × 10^5 2.830 0.100 0.138 0.059 3.128 4.947 × 10^4 200. GeV 2.001 × 10^5 2.871 0.150 0.212 0.084 3.317 6.809 × 10^4 300. GeV 3.001 × 10^5 2.916 0.237 0.337 0.126 3.617 9.695 × 10^4 400. GeV 4.001 × 10^5 2.949 0.327 0.468 0.168 3.913 1.235 × 10^5 800. GeV 8.001 × 10^5 3.028 0.704 1.013 0.340 5.085 2.129 × 10^5 1.00 TeV 1.000 × 10^6 3.053 0.899 1.295 0.427 5.674 2.502 × 10^5 1.16 TeV 1.160 × 10^6 3.070 1.055 1.518 0.498 6.141 Muon critical energy 1.40 TeV 1.400 × 10^6 3.092 1.292 1.856 0.606 6.845 3.142 × 10^5 2.00 TeV 2.000 × 10^6 3.134 1.895 2.716 0.877 8.622 3.922 × 10^5 3.00 TeV 3.000 × 10^6 3.182 2.907 4.148 1.344 11.582 4.919 × 10^5 4.00 TeV 4.000 × 10^6 3.217 3.938 5.601 1.819 14.576 5.687 × 10^5 8.00 TeV 8.000 × 10^6 3.303 8.112 11.455 3.798 26.669 7.687 × 10^5 10.0 TeV 1.000 × 10^7 3.331 10.225 14.404 4.818 32.778 8.362 × 10^5 14.0 TeV 1.400 × 10^7 3.374 14.441 20.280 6.919 45.014 9.399 × 10^5 20.0 TeV 2.000 × 10^7 3.420 20.821 29.143 10.149 63.532 1.052 × 10^6 30.0 TeV 3.000 × 10^7 3.473 31.445 43.888 15.757 94.563 1.180 × 10^6 40.0 TeV 4.000 × 10^7 3.512 42.128 58.682 21.513 125.836 1.271 × 10^6 80.0 TeV 8.000 × 10^7 3.607 84.965 117.910 45.684 252.166 1.491 × 10^6 100. TeV 1.000 × 10^8 3.638 106.440 147.560 58.218 315.857 1.562 × 10^6