Table 275: b(E) × 10^6 [cm^2g^{−1}] for Viton fluoroelastomer (C_5H_2F8)_n

⟨Z/A⟩ = 0.48585

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3017 0.1351 0.4588 0.8957 5. 0.4092 0.3315 0.4859 1.2266 10. 0.4975 0.4966 0.4720 1.4662 20. 0.5900 0.6759 0.4510 1.7170 50. 0.7151 0.9287 0.4280 2.0719 100. 0.8079 1.1069 0.4168 2.3317 200. 0.8957 1.2707 0.4112 2.5775 500. 0.9990 1.4369 0.4104 2.8462 1000. 1.0646 1.5381 0.4172 3.0200 2000. 1.1190 1.6084 0.4284 3.1557 5000. 1.1726 1.6704 0.4490 3.2920 10000. 1.2009 1.6996 0.4698 3.3704 20000. 1.2206 1.7181 0.4943 3.4329 50000. 1.2374 1.7328 0.5325 3.5027 100000. 1.2451 1.7388 0.5653 3.5493