Table 272: b(E) × 10^6 [cm^2g^{−1}] for Uranium oxide U-O_2

⟨Z/A⟩ = 0.39996

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.8875 0.2779 0.3701 2.5355 5. 2.6227 1.7521 0.3945 4.7694 10. 3.2237 2.9006 0.3863 6.5107 20. 3.8408 3.9568 0.3722 8.1698 50. 4.6480 5.5749 0.3565 10.5794 100. 5.2214 6.6413 0.3490 12.2118 200. 5.7440 7.5845 0.3455 13.6739 500. 6.3289 8.4475 0.3456 15.1220 1000. 6.6800 8.9048 0.3510 15.9358 2000. 6.9525 9.2333 0.3595 16.5452 5000. 7.2044 9.5078 0.3751 17.0874 10000. 7.3287 9.6343 0.3906 17.3538 20000. 7.4110 9.7167 0.4088 17.5366 50000. 7.4789 9.7778 0.4371 17.6937 100000. 7.5090 9.8034 0.4612 17.7736