Table 247: b(E) × 10^6 [cm^2g^{−1}] for Silver chloride AgCl

⟨Z/A⟩ = 0.44655

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.1341 0.4756 0.3969 2.0067 5. 1.5582 1.3111 0.4238 3.2931 10. 1.9030 1.9612 0.4073 4.2716 20. 2.2571 2.6012 0.3947 5.2530 50. 2.7228 3.5486 0.3814 6.6528 100. 3.0565 4.1854 0.3728 7.6147 200. 3.3640 4.7588 0.3688 8.4916 500. 3.7140 5.2939 0.3687 9.3766 1000. 3.9281 5.5818 0.3745 9.8845 2000. 4.0973 5.7917 0.3838 10.2728 5000. 4.2569 5.9683 0.4009 10.6262 10000. 4.3373 6.0508 0.4180 10.8060 20000. 4.3915 6.1041 0.4379 10.9336 50000. 4.4362 6.1449 0.4690 11.0501 100000. 4.4567 6.1618 0.4955 11.1140