Table 203: b(E) × 10^6 [cm^2g^{−1}] for Muscle-equivalent liquid with sucrose ⟨Z/A⟩ = 0.54828

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2807 0.1232 0.4703 0.8741 5. 0.3808 0.3044 0.4978 1.1829 10. 0.4635 0.4600 0.4828 1.4064 20. 0.5508 0.6294 0.4605 1.6407 50. 0.6696 0.8678 0.4361 1.9735 100. 0.7580 1.0363 0.4242 2.2185 200. 0.8423 1.1916 0.4181 2.4520 500. 0.9419 1.3511 0.4172 2.7101 1000. 1.0057 1.4488 0.4239 2.8784 2000. 1.0588 1.5175 0.4352 3.0114 5000. 1.1118 1.5781 0.4564 3.1463 10000. 1.1401 1.6067 0.4779 3.2247 20000. 1.1600 1.6247 0.5032 3.2879 50000. 1.1773 1.6390 0.5427 3.3589 100000. 1.1854 1.6448 0.5767 3.4070