Table 202: b(E) × 10^6 [cm^2g^{−1}] for Striated muscle (ICRU)

⟨Z/A⟩ = 0.55005

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2865 0.1260 0.4708 0.8833 5. 0.3887 0.3113 0.4984 1.1984 10. 0.4732 0.4701 0.4834 1.4268 20. 0.5622 0.6428 0.4611 1.6662 50. 0.6833 0.8859 0.4367 2.0060 100. 0.7733 1.0577 0.4248 2.2558 200. 0.8593 1.2157 0.4187 2.4937 500. 0.9606 1.3781 0.4178 2.7565 1000. 1.0256 1.4773 0.4244 2.9273 2000. 1.0795 1.5471 0.4358 3.0623 5000. 1.1334 1.6086 0.4570 3.1990 10000. 1.1621 1.6376 0.4785 3.2783 20000. 1.1824 1.6559 0.5038 3.3421 50000. 1.1999 1.6704 0.5433 3.4136 100000. 1.2082 1.6763 0.5773 3.4619