Table 186: b(E) × 10^6 [cm^2g^{−1}] for Lithium hydride (LiH)

⟨Z/A⟩ = 0.50321

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.1123 0.0442 0.4981 0.6546 5. 0.1538 0.1156 0.5230 0.7925 10. 0.1900 0.1866 0.5050 0.8816 20. 0.2295 0.2646 0.4799 0.9740 50. 0.2856 0.3729 0.4529 1.1114 100. 0.3293 0.4535 0.4398 1.2227 200. 0.3712 0.5249 0.4332 1.3293 500. 0.4221 0.6062 0.4320 1.4603 1000. 0.4559 0.6581 0.4391 1.5532 2000. 0.4847 0.6969 0.4513 1.6331 5000. 0.5147 0.7326 0.4742 1.7214 10000. 0.5312 0.7496 0.4973 1.7781 20000. 0.5433 0.7602 0.5245 1.8281 50000. 0.5541 0.7682 0.5673 1.8897 100000. 0.5591 0.7716 0.6043 1.9349