Table 171: b(E) × 10^6 [cm^2g^{−1}] for Plate glass ⟨Z/A⟩ = 0.49731

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.4312 0.1981 0.4471 1.0764 5. 0.5853 0.4850 0.4748 1.5451 10. 0.7110 0.7189 0.4621 1.8921 20. 0.8417 0.9693 0.4421 2.2531 50. 1.0166 1.3243 0.4202 2.7611 100. 1.1445 1.5720 0.4095 3.1260 200. 1.2655 1.7952 0.4041 3.4648 500. 1.4059 2.0252 0.4035 3.8346 1000. 1.4947 2.1551 0.4101 4.0598 2000. 1.5671 2.2485 0.4208 4.2364 5000. 1.6378 2.3291 0.4408 4.4078 10000. 1.6746 2.3671 0.4610 4.5028 20000. 1.7006 2.3913 0.4845 4.5764 50000. 1.7216 2.4105 0.5214 4.6534 100000. 1.7317 2.4184 0.5529 4.7030