Table 160: b(E) × 10^6 [cm^2g^{−1}] for Ferrous sulfate dosimeter solution

⟨Z/A⟩ = 0.55329

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2944 0.1299 0.4690 0.8933 5. 0.3995 0.3206 0.4966 1.2167 10. 0.4863 0.4836 0.4818 1.4517 20. 0.5777 0.6607 0.4596 1.6979 50. 0.7018 0.9101 0.4353 2.0472 100. 0.7939 1.0862 0.4234 2.3035 200. 0.8820 1.2480 0.4173 2.5474 500. 0.9857 1.4141 0.4164 2.8163 1000. 1.0521 1.5154 0.4231 2.9906 2000. 1.1073 1.5866 0.4343 3.1282 5000. 1.1623 1.6493 0.4554 3.2670 10000. 1.1916 1.6788 0.4768 3.3474 20000. 1.2123 1.6975 0.5020 3.4118 50000. 1.2301 1.7123 0.5414 3.4838 100000. 1.2387 1.7183 0.5752 3.5323