Table 127: b(E) × 10^6 [cm^2g^{−1}] for Cadmium telluride (CdTe)

⟨Z/A⟩ = 0.41665

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3240 0.5285 0.3825 2.2350 5. 1.8246 1.5231 0.4085 3.7562 10. 2.2318 2.2944 0.3958 4.9220 20. 2.6497 3.0419 0.3803 6.0720 50. 3.1985 4.1574 0.3692 7.7253 100. 3.5908 4.9029 0.3614 8.8550 200. 3.9512 5.5708 0.3576 9.8795 500. 4.3596 6.1899 0.3577 10.9071 1000. 4.6082 6.5213 0.3633 11.4927 2000. 4.8036 6.7619 0.3722 11.9377 5000. 4.9871 6.9640 0.3885 12.3396 10000. 5.0789 7.0579 0.4048 12.5416 20000. 5.1402 7.1192 0.4236 12.6831 50000. 5.1913 7.1653 0.4530 12.8096 100000. 5.2143 7.1846 0.4782 12.8771