Table 119: b(E) × 10^6 [cm^2g^{−1}] for Compact bone (ICRU)

⟨Z/A⟩ = 0.53010

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3535 0.1593 0.4614 0.9742 5. 0.4801 0.3928 0.4889 1.3618 10. 0.5841 0.5875 0.4748 1.6463 20. 0.6928 0.7965 0.4533 1.9426 50. 0.8394 1.0922 0.4299 2.3615 100. 0.9476 1.2995 0.4184 2.6655 200. 1.0498 1.4893 0.4126 2.9516 500. 1.1696 1.6818 0.4117 3.2632 1000. 1.2458 1.7948 0.4184 3.4590 2000. 1.3084 1.8756 0.4295 3.6135 5000. 1.3702 1.9461 0.4502 3.7665 10000. 1.4027 1.9793 0.4712 3.8533 20000. 1.4257 2.0004 0.4958 3.9219 50000. 1.4449 2.0170 0.5343 3.9961 100000. 1.4539 2.0238 0.5674 4.0451