Table 108: b(E) × 10^6 [cm^2g^{−1}] for Ammonia (NH_3) ⟨Z/A⟩ = 0.59719

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2478 0.1067 0.4797 0.8343 5. 0.3367 0.2659 0.5073 1.1099 10. 0.4107 0.4063 0.4914 1.3084 20. 0.4893 0.5592 0.4681 1.5167 50. 0.5972 0.7741 0.4426 1.8139 100. 0.6779 0.9264 0.4301 2.0344 200. 0.7555 1.0672 0.4236 2.2462 500. 0.8474 1.2139 0.4226 2.4839 1000. 0.9069 1.3043 0.4292 2.6404 2000. 0.9566 1.3686 0.4408 2.7659 5000. 1.0069 1.4255 0.4623 2.8948 10000. 1.0340 1.4524 0.4843 2.9708 20000. 1.0533 1.4694 0.5102 3.0330 50000. 1.0703 1.4826 0.5509 3.1038 100000. 1.0785 1.4880 0.5860 3.1526