Table 103: b(E) × 10^6 [cm^2g^{−1}] for Adipose tissue (ICRP)

⟨Z/A⟩ = 0.55947

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2440 0.1052 0.4772 0.8264 5. 0.3312 0.2616 0.5044 1.0972 10. 0.4038 0.3989 0.4888 1.2915 20. 0.4807 0.5487 0.4658 1.4952 50. 0.5861 0.7591 0.4407 1.7860 100. 0.6656 0.9084 0.4284 2.0025 200. 0.7406 1.0465 0.4221 2.2092 500. 0.8302 1.1901 0.4211 2.4414 1000. 0.8880 1.2786 0.4278 2.5945 2000. 0.9363 1.3414 0.4394 2.7170 5000. 0.9849 1.3971 0.4609 2.8430 10000. 1.0110 1.4234 0.4828 2.9173 20000. 1.0296 1.4400 0.5086 2.9781 50000. 1.0457 1.4530 0.5489 3.0476 100000. 1.0530 1.4583 0.5837 3.0950