Table 099: b(E) × 10^6 [cm^2g^{−1}] for A-150 tissue-equivalent plastic

⟨Z/A⟩ = 0.54903

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2437 0.1052 0.4765 0.8255 5. 0.3308 0.2617 0.5036 1.0961 10. 0.4033 0.3987 0.4881 1.2901 20. 0.4801 0.5481 0.4652 1.4933 50. 0.5852 0.7579 0.4402 1.7834 100. 0.6646 0.9069 0.4279 1.9994 200. 0.7391 1.0446 0.4217 2.2053 500. 0.8282 1.1877 0.4206 2.4365 1000. 0.8857 1.2756 0.4274 2.5888 2000. 0.9336 1.3381 0.4390 2.7107 5000. 0.9818 1.3936 0.4605 2.8360 10000. 1.0077 1.4197 0.4824 2.9098 20000. 1.0260 1.4362 0.5081 2.9703 50000. 1.0419 1.4492 0.5484 3.0394 100000. 1.0489 1.4545 0.5830 3.0864