Table 023: b(E) × 10^6 [cm^2g^{−1}] for Vanadium, Z = 23, A =50.9415(1)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.7202 0.3417 0.4149 1.4769 5. 0.9830 0.8477 0.4234 2.2540 10. 1.1965 1.2462 0.4323 2.8749 20. 1.4164 1.6551 0.4152 3.4868 50. 1.7073 2.2517 0.3962 4.3551 100. 1.9174 2.6578 0.3870 4.9622 200. 2.1130 3.0302 0.3825 5.5257 500. 2.3384 3.3835 0.3823 6.1043 1000. 2.4784 3.5766 0.3884 6.4435 2000. 2.5905 3.7187 0.3983 6.7074 5000. 2.6980 3.8390 0.4165 6.9535 10000. 2.7529 3.8955 0.4347 7.0831 20000. 2.7903 3.9322 0.4559 7.1783 50000. 2.8216 3.9603 0.4889 7.2708 100000. 2.8361 3.9720 0.5172 7.3253